Miami | Suspension Lamp

Vendor: Antonangeli
Type:
Price: 584.00 - 728.00 (2 variants)

Miami leads outside the atmosphere of the indoor lighting. Decisive is the choice of the lamp shade as light shade. The essential and linear structure’s drawing emphatise the white resin glass shade, planed and produced to be waterproof and resistant to changes in the heat. Miami is available as floor version, on a picket structure or on a stone base with wheels and also without wheels, as suspension lamp with a simple fixing hook, and wall.