10th Prato Fiorito Floor Light

Vendor: Exteta
Type:
Price: 4960.00

The Exteta 10th Prato Fiorito Floor Light by Massimo Castagna is a sophisticated modular lighting system designed to enhance outdoor spaces with both beauty and functionality. Inspired by nature, the irregular brass stems stretch gracefully upwards like tree branches, creating a harmonious blend of light and organic form.

The lighting bodies, combined with the reflective base in polished burnished brass, bring a warm and inviting glow to outdoor areas. The brass stems add a touch of exclusivity, shaping compositions that are both unique and elegant, making this floor light not only a functional piece but also a sculptural statement.

Perfect for creating atmospheric lighting in gardens, terraces, or other outdoor settings, the Prato Fiorito stimulates the senses and transforms any space into a luxurious retreat. Its modular design allows for versatile configurations, adapting to various design preferences while maintaining a seamless connection to the natural world.